insert into transactional.source_config
(file_mnemonic,file_sheet_mnemonic,block_tag,f1_modified,f1_keyword)
values ('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_Key_Performance_Parameters','Key Performance Parameters','Key Performance Parameters'),
('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_varying_speed_test_natural_ambient','Varying Speed Test / Full Throttle Performance @ Natural Ambient','Varying Speed Test / Full Throttle Performance @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_2hrs_max_power_natural_ambient','2Hrs Max Power Test @ Natural Ambient','2Hrs Max Power Test @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_varying_load_rated_rpm',' Varying loads @ Rated RPM @ Natural Ambient',' Varying loads @ Rated RPM @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_varying_load_std_pto','Varying load @ STD. PTO @ Natural Ambient','Varying load @ STD. PTO @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_smoke_test','Smoke Test @ Natural Ambient','Smoke Test @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_varying_speed_test_high_ambient','Varying Speed Test / Full Throttle Performance @ High Ambient','Varying Speed Test / Full Throttle Performance @ High Ambient'),
('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_2hrs_max_power_high_ambient','2Hrs Max Power Test @ High Ambient','2Hrs Max Power Test @ High Ambient'),
('PTOBEN','PTOBEN_PRFN','PTOBEN_PRF_engine_oil_consumption','Engine Oil Consumption @ High Ambient','Engine Oil Consumption @ High Ambient'),

('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_Key_Performance_Parameters','Key Performance Parameters','Key Performance Parameters'),
('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_varying_speed_test_natural_ambient','Varying Speed Test / Full Throttle Performance @ Natural Ambient','Varying Speed Test / Full Throttle Performance @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_2hrs_max_power_natural_ambient','2Hrs Max Power Test @ Natural Ambient','2Hrs Max Power Test @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_varying_load_rated_rpm',' Varying loads @ Rated RPM @ Natural Ambient',' Varying loads @ Rated RPM @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_varying_load_std_pto','Varying load @ STD. PTO @ Natural Ambient','Varying load @ STD. PTO @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_smoke_test','Smoke Test @ Natural Ambient','Smoke Test @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_varying_speed_test_high_ambient','Varying Speed Test / Full Throttle Performance @ High Ambient','Varying Speed Test / Full Throttle Performance @ High Ambient'),
('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_2hrs_max_power_high_ambient','2Hrs Max Power Test @ High Ambient','2Hrs Max Power Test @ High Ambient'),
('PTOBEN','PTOBEN_PRFB','PTOBEN_PRF_engine_oil_consumption','Engine Oil Consumption @ High Ambient','Engine Oil Consumption @ High Ambient'),

('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_Key_Performance_Parameters','Key Performance Parameters','Key Performance Parameters'),
('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_varying_speed_test_natural_ambient','Varying Speed Test / Full Throttle Performance @ Natural Ambient','Varying Speed Test / Full Throttle Performance @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_2hrs_max_power_natural_ambient','2Hrs Max Power Test @ Natural Ambient','2Hrs Max Power Test @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_varying_load_rated_rpm',' Varying loads @ Rated RPM @ Natural Ambient',' Varying loads @ Rated RPM @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_varying_load_std_pto','Varying load @ STD. PTO @ Natural Ambient','Varying load @ STD. PTO @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_smoke_test','Smoke Test @ Natural Ambient','Smoke Test @ Natural Ambient'),
('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_varying_speed_test_high_ambient','Varying Speed Test / Full Throttle Performance @ High Ambient','Varying Speed Test / Full Throttle Performance @ High Ambient'),
('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_2hrs_max_power_high_ambient','2Hrs Max Power Test @ High Ambient','2Hrs Max Power Test @ High Ambient'),
('PTOBEN','PTOBEN_PRFE','PTOBEN_PRF_engine_oil_consumption','Engine Oil Consumption @ High Ambient','Engine Oil Consumption @ High Ambient'),

('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_Key_Performance_Parameters','Key Performance Parameters','Key Performance Parameters'),
('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_varying_speed_test_natural_ambient','Varying Speed Test / Full Throttle Performance @ Natural Ambient','Varying Speed Test / Full Throttle Performance @ Natural Ambient'),
('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_2hrs_max_power_natural_ambient','2Hrs Max Power Test @ Natural Ambient','2Hrs Max Power Test @ Natural Ambient'),
('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_varying_load_rated_rpm',' Varying loads @ Rated RPM @ Natural Ambient',' Varying loads @ Rated RPM @ Natural Ambient'),
('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_varying_load_std_pto','Varying load @ STD. PTO @ Natural Ambient','Varying load @ STD. PTO @ Natural Ambient'),
('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_smoke_test','Smoke Test @ Natural Ambient','Smoke Test @ Natural Ambient'),
('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_varying_speed_test_high_ambient','Varying Speed Test / Full Throttle Performance @ High Ambient','Varying Speed Test / Full Throttle Performance @ High Ambient'),
('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_2hrs_max_power_high_ambient','2Hrs Max Power Test @ High Ambient','2Hrs Max Power Test @ High Ambient'),
('PTOSTD','PTOSTD_PRF','PTOBEN_PRF_engine_oil_consumption','Engine Oil Consumption @ High Ambient','Engine Oil Consumption @ High Ambient'),

('PTOBEN','PTOBEN_MPM','PTOBEN_MPM_data_inputs','Data Inputs','Data Inputs'),
('PTOSTD','PTOSTD_MPM','PTOBEN_MPM_data_inputs','Data Inputs','Data Inputs'),

('PTOBEN','PTOBEN_GVG','PTOBEN_GVG_data_inputs','Data Inputs','Data Inputs'),
('PTOBEN','PTOBEN_GVG','PTOBEN_GVG_graphs','Graphs - for Example','Graphs - for Example'),


('PTOSTD','PTOSTD_GVG','PTOBEN_GVG_data_inputs','Data Inputs','Data Inputs'),
('PTOSTD','PTOSTD_GVG','PTOBEN_GVG_graphs','Graphs - for Example','Graphs - for Example')
