
drop function if exists staging2.fn_dummy;
CREATE OR REPLACE FUNCTION staging2.fn_dummy()
   RETURNS void AS $$
   begin
   select f1_modified='Test equipment’s used' from transactional.source_config;
   end
$$ LANGUAGE plpgsql;
